\documentclass[11pt,twoside]{article}\makeatletter

\IfFileExists{xcolor.sty}%
  {\RequirePackage{xcolor}}%
  {\RequirePackage{color}}
\usepackage{colortbl}
\usepackage{wrapfig}
\usepackage{ifxetex}
\ifxetex
  \usepackage{fontspec}
  \usepackage{xunicode}
  \catcode`⃥=\active \def⃥{\textbackslash}
  \catcode`❴=\active \def❴{\{}
  \catcode`❵=\active \def❵{\}}
  \def\textJapanese{\fontspec{Noto Sans CJK JP}}
  \def\textChinese{\fontspec{Noto Sans CJK SC}}
  \def\textKorean{\fontspec{Noto Sans CJK KR}}
  \setmonofont{DejaVu Sans Mono}
  
\else
  \IfFileExists{utf8x.def}%
   {\usepackage[utf8x]{inputenc}
      \PrerenderUnicode{–}
    }%
   {\usepackage[utf8]{inputenc}}
  \usepackage[english]{babel}
  \usepackage[T1]{fontenc}
  \usepackage{float}
  \usepackage[]{ucs}
  \uc@dclc{8421}{default}{\textbackslash }
  \uc@dclc{10100}{default}{\{}
  \uc@dclc{10101}{default}{\}}
  \uc@dclc{8491}{default}{\AA{}}
  \uc@dclc{8239}{default}{\,}
  \uc@dclc{20154}{default}{ }
  \uc@dclc{10148}{default}{>}
  \def\textschwa{\rotatebox{-90}{e}}
  \def\textJapanese{}
  \def\textChinese{}
  \IfFileExists{tipa.sty}{\usepackage{tipa}}{}
\fi
\def\exampleFont{\ttfamily\small}
\DeclareTextSymbol{\textpi}{OML}{25}
\usepackage{relsize}
\RequirePackage{array}
\def\@testpach{\@chclass
 \ifnum \@lastchclass=6 \@ne \@chnum \@ne \else
  \ifnum \@lastchclass=7 5 \else
   \ifnum \@lastchclass=8 \tw@ \else
    \ifnum \@lastchclass=9 \thr@@
   \else \z@
   \ifnum \@lastchclass = 10 \else
   \edef\@nextchar{\expandafter\string\@nextchar}%
   \@chnum
   \if \@nextchar c\z@ \else
    \if \@nextchar l\@ne \else
     \if \@nextchar r\tw@ \else
   \z@ \@chclass
   \if\@nextchar |\@ne \else
    \if \@nextchar !6 \else
     \if \@nextchar @7 \else
      \if \@nextchar (8 \else
       \if \@nextchar )9 \else
  10
  \@chnum
  \if \@nextchar m\thr@@\else
   \if \@nextchar p4 \else
    \if \@nextchar b5 \else
   \z@ \@chclass \z@ \@preamerr \z@ \fi \fi \fi \fi
   \fi \fi  \fi  \fi  \fi  \fi  \fi \fi \fi \fi \fi \fi}
\gdef\arraybackslash{\let\\=\@arraycr}
\def\@textsubscript#1{{\m@th\ensuremath{_{\mbox{\fontsize\sf@size\z@#1}}}}}
\def\Panel#1#2#3#4{\multicolumn{#3}{){\columncolor{#2}}#4}{#1}}
\def\abbr{}
\def\corr{}
\def\expan{}
\def\gap{}
\def\orig{}
\def\reg{}
\def\ref{}
\def\sic{}
\def\persName{}\def\name{}
\def\placeName{}
\def\orgName{}
\def\textcal#1{{\fontspec{Lucida Calligraphy}#1}}
\def\textgothic#1{{\fontspec{Lucida Blackletter}#1}}
\def\textlarge#1{{\large #1}}
\def\textoverbar#1{\ensuremath{\overline{#1}}}
\def\textquoted#1{‘#1’}
\def\textsmall#1{{\small #1}}
\def\textsubscript#1{\@textsubscript{\selectfont#1}}
\def\textxi{\ensuremath{\xi}}
\def\titlem{\itshape}
\newenvironment{biblfree}{}{\ifvmode\par\fi }
\newenvironment{bibl}{}{}
\newenvironment{byline}{\vskip6pt\itshape\fontsize{16pt}{18pt}\selectfont}{\par }
\newenvironment{citbibl}{}{\ifvmode\par\fi }
\newenvironment{docAuthor}{\ifvmode\vskip4pt\fontsize{16pt}{18pt}\selectfont\fi\itshape}{\ifvmode\par\fi }
\newenvironment{docDate}{}{\ifvmode\par\fi }
\newenvironment{docImprint}{\vskip 6pt}{\ifvmode\par\fi }
\newenvironment{docTitle}{\vskip6pt\bfseries\fontsize{22pt}{25pt}\selectfont}{\par }
\newenvironment{msHead}{\vskip 6pt}{\par}
\newenvironment{msItem}{\vskip 6pt}{\par}
\newenvironment{rubric}{}{}
\newenvironment{titlePart}{}{\par }

\newcolumntype{L}[1]{){\raggedright\arraybackslash}p{#1}}
\newcolumntype{C}[1]{){\centering\arraybackslash}p{#1}}
\newcolumntype{R}[1]{){\raggedleft\arraybackslash}p{#1}}
\newcolumntype{P}[1]{){\arraybackslash}p{#1}}
\newcolumntype{B}[1]{){\arraybackslash}b{#1}}
\newcolumntype{M}[1]{){\arraybackslash}m{#1}}
\definecolor{label}{gray}{0.75}
\def\unusedattribute#1{\sout{\textcolor{label}{#1}}}
\DeclareRobustCommand*{\xref}{\hyper@normalise\xref@}
\def\xref@#1#2{\hyper@linkurl{#2}{#1}}
\begingroup
\catcode`\_=\active
\gdef_#1{\ensuremath{\sb{\mathrm{#1}}}}
\endgroup
\mathcode`\_=\string"8000
\catcode`\_=12\relax

\usepackage[a4paper,twoside,lmargin=1in,rmargin=1in,tmargin=1in,bmargin=1in,marginparwidth=0.75in]{geometry}
\usepackage{framed}

\definecolor{shadecolor}{gray}{0.95}
\usepackage{longtable}
\usepackage[normalem]{ulem}
\usepackage{fancyvrb}
\usepackage{fancyhdr}
\usepackage{graphicx}
\usepackage{marginnote}

\renewcommand{\@cite}[1]{#1}


\renewcommand*{\marginfont}{\itshape\footnotesize}

\def\Gin@extensions{.pdf,.png,.jpg,.mps,.tif}

  \pagestyle{fancy}

\usepackage[pdftitle={Experimental Investigation \& Modelling Studies for Different Tubes of Heat Exchanger using CFD},
 pdfauthor={}]{hyperref}
\hyperbaseurl{}

	 \paperwidth210mm
	 \paperheight297mm
              
\def\@pnumwidth{1.55em}
\def\@tocrmarg {2.55em}
\def\@dotsep{4.5}
\setcounter{tocdepth}{3}
\clubpenalty=8000
\emergencystretch 3em
\hbadness=4000
\hyphenpenalty=400
\pretolerance=750
\tolerance=2000
\vbadness=4000
\widowpenalty=10000

\renewcommand\section{\@startsection {section}{1}{\z@}%
     {-1.75ex \@plus -0.5ex \@minus -.2ex}%
     {0.5ex \@plus .2ex}%
     {\reset@font\Large\bfseries}}
\renewcommand\subsection{\@startsection{subsection}{2}{\z@}%
     {-1.75ex\@plus -0.5ex \@minus- .2ex}%
     {0.5ex \@plus .2ex}%
     {\reset@font\Large}}
\renewcommand\subsubsection{\@startsection{subsubsection}{3}{\z@}%
     {-1.5ex\@plus -0.35ex \@minus -.2ex}%
     {0.5ex \@plus .2ex}%
     {\reset@font\large}}
\renewcommand\paragraph{\@startsection{paragraph}{4}{\z@}%
     {-1ex \@plus-0.35ex \@minus -0.2ex}%
     {0.5ex \@plus .2ex}%
     {\reset@font\normalsize}}
\renewcommand\subparagraph{\@startsection{subparagraph}{5}{\parindent}%
     {1.5ex \@plus1ex \@minus .2ex}%
     {-1em}%
     {\reset@font\normalsize\bfseries}}


\def\l@section#1#2{\addpenalty{\@secpenalty} \addvspace{1.0em plus 1pt}
 \@tempdima 1.5em \begingroup
 \parindent \z@ \rightskip \@pnumwidth 
 \parfillskip -\@pnumwidth 
 \bfseries \leavevmode #1\hfil \hbox to\@pnumwidth{\hss #2}\par
 \endgroup}
\def\l@subsection{\@dottedtocline{2}{1.5em}{2.3em}}
\def\l@subsubsection{\@dottedtocline{3}{3.8em}{3.2em}}
\def\l@paragraph{\@dottedtocline{4}{7.0em}{4.1em}}
\def\l@subparagraph{\@dottedtocline{5}{10em}{5em}}
\@ifundefined{c@section}{\newcounter{section}}{}
\@ifundefined{c@chapter}{\newcounter{chapter}}{}
\newif\if@mainmatter 
\@mainmattertrue
\def\chaptername{Chapter}
\def\frontmatter{%
  \pagenumbering{roman}
  \def\thechapter{\@roman\c@chapter}
  \def\theHchapter{\roman{chapter}}
  \def\thesection{\@roman\c@section}
  \def\theHsection{\roman{section}}
  \def\@chapapp{}%
}
\def\mainmatter{%
  \cleardoublepage
  \def\thechapter{\@arabic\c@chapter}
  \setcounter{chapter}{0}
  \setcounter{section}{0}
  \pagenumbering{arabic}
  \setcounter{secnumdepth}{6}
  \def\@chapapp{\chaptername}%
  \def\theHchapter{\arabic{chapter}}
  \def\thesection{\@arabic\c@section}
  \def\theHsection{\arabic{section}}
}
\def\backmatter{%
  \cleardoublepage
  \setcounter{chapter}{0}
  \setcounter{section}{0}
  \setcounter{secnumdepth}{2}
  \def\@chapapp{\appendixname}%
  \def\thechapter{\@Alph\c@chapter}
  \def\theHchapter{\Alph{chapter}}
  \appendix
}
\newenvironment{bibitemlist}[1]{%
   \list{\@biblabel{\@arabic\c@enumiv}}%
       {\settowidth\labelwidth{\@biblabel{#1}}%
        \leftmargin\labelwidth
        \advance\leftmargin\labelsep
        \@openbib@code
        \usecounter{enumiv}%
        \let\p@enumiv\@empty
        \renewcommand\theenumiv{\@arabic\c@enumiv}%
	}%
  \sloppy
  \clubpenalty4000
  \@clubpenalty \clubpenalty
  \widowpenalty4000%
  \sfcode`\.\@m}%
  {\def\@noitemerr
    {\@latex@warning{Empty `bibitemlist' environment}}%
    \endlist}

\def\tableofcontents{\section*{\contentsname}\@starttoc{toc}}
\parskip0pt
\parindent1em
\def\Panel#1#2#3#4{\multicolumn{#3}{){\columncolor{#2}}#4}{#1}}
\newenvironment{reflist}{%
  \begin{raggedright}\begin{list}{}
  {%
   \setlength{\topsep}{0pt}%
   \setlength{\rightmargin}{0.25in}%
   \setlength{\itemsep}{0pt}%
   \setlength{\itemindent}{0pt}%
   \setlength{\parskip}{0pt}%
   \setlength{\parsep}{2pt}%
   \def\makelabel##1{\itshape ##1}}%
  }
  {\end{list}\end{raggedright}}
\newenvironment{sansreflist}{%
  \begin{raggedright}\begin{list}{}
  {%
   \setlength{\topsep}{0pt}%
   \setlength{\rightmargin}{0.25in}%
   \setlength{\itemindent}{0pt}%
   \setlength{\parskip}{0pt}%
   \setlength{\itemsep}{0pt}%
   \setlength{\parsep}{2pt}%
   \def\makelabel##1{\upshape ##1}}%
  }
  {\end{list}\end{raggedright}}
\newenvironment{specHead}[2]%
 {\vspace{20pt}\hrule\vspace{10pt}%
  \phantomsection\label{#1}\markright{#2}%

  \pdfbookmark[2]{#2}{#1}%
  \hspace{-0.75in}{\bfseries\fontsize{16pt}{18pt}\selectfont#2}%
  }{}
      \def\TheFullDate{2013-01-15 (revised: 15 January 2013)}
\def\TheID{\makeatother }
\def\TheDate{2013-01-15}
\title{Experimental Investigation \& Modelling Studies for Different Tubes of Heat Exchanger using CFD}
\author{}\makeatletter 
\makeatletter
\newcommand*{\cleartoleftpage}{%
  \clearpage
    \if@twoside
    \ifodd\c@page
      \hbox{}\newpage
      \if@twocolumn
        \hbox{}\newpage
      \fi
    \fi
  \fi
}
\makeatother
\makeatletter
\thispagestyle{empty}
\markright{\@title}\markboth{\@title}{\@author}
\renewcommand\small{\@setfontsize\small{9pt}{11pt}\abovedisplayskip 8.5\p@ plus3\p@ minus4\p@
\belowdisplayskip \abovedisplayskip
\abovedisplayshortskip \z@ plus2\p@
\belowdisplayshortskip 4\p@ plus2\p@ minus2\p@
\def\@listi{\leftmargin\leftmargini
               \topsep 2\p@ plus1\p@ minus1\p@
               \parsep 2\p@ plus\p@ minus\p@
               \itemsep 1pt}
}
\makeatother
\fvset{frame=single,numberblanklines=false,xleftmargin=5mm,xrightmargin=5mm}
\fancyhf{} 
\setlength{\headheight}{14pt}
\fancyhead[LE]{\bfseries\leftmark} 
\fancyhead[RO]{\bfseries\rightmark} 
\fancyfoot[RO]{}
\fancyfoot[CO]{\thepage}
\fancyfoot[LO]{\TheID}
\fancyfoot[LE]{}
\fancyfoot[CE]{\thepage}
\fancyfoot[RE]{\TheID}
\hypersetup{citebordercolor=0.75 0.75 0.75,linkbordercolor=0.75 0.75 0.75,urlbordercolor=0.75 0.75 0.75,bookmarksnumbered=true}
\fancypagestyle{plain}{\fancyhead{}\renewcommand{\headrulewidth}{0pt}}

\date{}
\usepackage{authblk}

\providecommand{\keywords}[1]
{
\footnotesize
  \textbf{\textit{Index terms---}} #1
}

\usepackage{graphicx,xcolor}
\definecolor{GJBlue}{HTML}{273B81}
\definecolor{GJLightBlue}{HTML}{0A9DD9}
\definecolor{GJMediumGrey}{HTML}{6D6E70}
\definecolor{GJLightGrey}{HTML}{929497} 

\renewenvironment{abstract}{%
   \setlength{\parindent}{0pt}\raggedright
   \textcolor{GJMediumGrey}{\rule{\textwidth}{2pt}}
   \vskip16pt
   \textcolor{GJBlue}{\large\bfseries\abstractname\space}
}{%   
   \vskip8pt
   \textcolor{GJMediumGrey}{\rule{\textwidth}{2pt}}
   \vskip16pt
}

\usepackage[absolute,overlay]{textpos}

\makeatother 
      \usepackage{lineno}
      \linenumbers
      
\begin{document}

             \author[1]{Er. Krishan Kant  Sharma}

             \affil[1]{  }

\renewcommand\Authands{ and }

\date{\small \em Received: 8 December 2012 Accepted: 31 December 2012 Published: 15 January 2013}

\maketitle


\begin{abstract}
        


Metal matrix hybrid composites (MMHCs) are now gaining their usage in aerospace, automotive and other industries because of their inherent properties like high strength to weight ratio, hardness and wear resistance, good creep behaviour, light weight, design flexibility and low wear rate etc. Al alloy base matrix reinforced with silicon carbide (10%) and graphite (5%) particles was fabricated by stir casting process. The wear and frictional properties of metal matrix hybrid composites were studied by performing dry sliding wear test using pin on disc wear test apparatus. Experiments were conducted based on the plan of experiments generated through Taguchi?s technique. A L9 Orthogonal array was selected for analysis of data. Investigation to find the influence of applied load, sliding speed and track diameter on wear rate as well as coefficient of friction during wearing process was carried out using ANOVA. Objective of the model was chosen as smaller the better characteristics to analyse the dry sliding wear resistance. Results show that track diameter has highest influence followed by load and sliding speed.

\end{abstract}


\keywords{taguchi method, orthogonal array, ANOVA, metal matrix hybrid composites.}

\begin{textblock*}{18cm}(1cm,1cm) % {block width} (coords) 
\textcolor{GJBlue}{\LARGE Global Journals \LaTeX\ JournalKaleidoscope\texttrademark}
\end{textblock*}

\begin{textblock*}{18cm}(1.4cm,1.5cm) % {block width} (coords) 
\textcolor{GJBlue}{\footnotesize \\ Artificial Intelligence formulated this projection for compatibility purposes from the original article published at Global Journals. However, this technology is currently in beta. \emph{Therefore, kindly ignore odd layouts, missed formulae, text, tables, or figures.}}
\end{textblock*}


\let\tabcellsep& 	 	 		 
\section[{Introduction}]{Introduction}\par
n a Heat Exchanger, consists of bundle of tubes. One fluid flows through the tubes while the second fluid flows space between the tubes and shell. Tubes plays an important role while exchanging heat from hot fluid to cold fluid. Although they are not specially compact, their robustness and shape make them well suited for high pressure operations. They have larger heat transfer surface area to volume ratio than the most of common types of heat exchangers, and they are manufactured easily for a large variety of sizes and flow configurations. The main design objectives here are to accommodate thermal expansion, to furnish ease of cleaning, or to provide the least expensive construction.\par
To get robust, least expensive and technically sound design, we will be dealing with four different designs viz. "Circular Tube", "Elliptical type(Oval)", "Twisted type" and "Coil type" Along with construction issue we too come across the difficulties in improving heat transfer rates, which means to have high effectiveness, we were in flow to compromise the design and robustness. In order to achieve the maximum heat transfer rate an analysis is made on single tube for Author ?: Mechanical Engineering Department, MIT, Aurangabad (M.S), India. e-mail: roshan.marode@gmail.com Author ?: Associate Professor, Mechanical Engineering Department, MIT, Aurangabad (M.S), India. e-mail: ashokkeche@gmail.com different designs with two different fluids (Water and Al2O3-water based Nano fluid) in a shell and tube heat exchanger. This paper shows how maximum heat transfer rate has been achieved by comparing four different designs and getting optimal design solutions using computational techniques. To measure the performance of different designs, its model is suitably designed and fabricated so as to perform experimental tests. Thermal analysis has been carried out for four different designs with two fluids and on the basis of comparative results is made which one give the best heat transfer rates. After the modification of design an experimental validation is carried out to validate the results from analysis. 
\section[{II.}]{II.} 
\section[{Literature Review}]{Literature Review}\par
Ala Hasan \hyperref[b0]{[1]} experimentally investigated five oval tubes and compared with that for a circular tube in a cross-flow way and concluded that oval tube gives higher heat transfer results. The outcome was taken for comparing results of oval and circular tubes which helped for optimized design. Abdul Kareem Abbaset al \hyperref[b1]{[2]} shows heat transfer augmentation due to twisting parameter was investigated in a twisted tube of rectangular/square cross sectional area. Also swirling increases internal mixing process which enhances internal thermal equilibrium. The heat transfer coefficient also increases as Reynolds number increased as velocity components are increased. This relation shown was used as function and one of the parameter in design. Su Thet Mon Than et al \hyperref[b2]{[3]}In this paper data is evaluated for heat transfer rate having spiral tubes and pressure drop and checking whether the assumed design satisfies all requirement or not by using computational techniques. Satisfied design found was used for coil type tubes for analysing the heat transfer rate.Jay J. Bhavsaret al \hyperref[b3]{[4]}objective of this paper is to design and analyze of spiral tube heat exchanger. In this newly proposed design hot fluid flows in axial path while the cold fluid flows in a spiral path. The presented work was used in spiral tube designand has high heat transfer rate compared with helical coil heat exchanger and spiral plate heat exchanger.P. M. Deshpande et al \hyperref[b4]{[5]}They studied horizontal spiral coil tube (HSTC) for various forces (viscous, buoyancy and centrifugal force) acting on fluid element in coil; of which the centrifugal force is predominant and results in secondary flow. This phenomenon also depends on the physical properties of fluid at a given temperature. They also concluded that as the coil diameter reduces the curvature ratio increase that increases the pressure drop. Relation was used for designing coil type tubes.  
\section[{Experimental Work}]{Experimental Work}\par
We achieved temperature range by placing thermocouple at 250 mm apart for four design tubes.     
\section[{Thermal Analysis of Tubes with two ifferent Media}]{Thermal Analysis of Tubes with two ifferent Media}\par
Thermal Analysis is made by using Computational Fluid Dynamics. In this a compromise between the computer time and accuracy of the analysis We have focused only on twisted type tube as in above sequence of calculations we are getting high heat transfer rate and high effectiveness by calculation.\par
In above colourful diagram, if we compare d the twisted tube temperature contours with water as base fluid, an CFD analyst may observe that for 4 th and 5 th plane we are getting blue colour contours as compared to case 1, which directly shows the temperature gradient in above case is high along with effectiveness. 
\section[{VII.}]{VII.} 
\section[{Conclusion}]{Conclusion}\par
This study shows the design and thermal analysis of different tubes. Experimentally, same designs are made and results are evaluated. With relate to same design tubes are thermally analysed in ANSYS comparing the result for both water-water(Case-I) and water-Al2O3(Case-II) for four different tubes we are in conclusion that twisted type of tube is giving high heat transfer coefficient as compared to other i.e 1.14 more. Along with effectiveness, twisted tube is at higher side by 1.17.So according to my research one should go for twisted tube.\par
However, a good understanding of the underlying principles of exchanger design is needed to use this software effectively. The possibility to increase in these characteristics using the latest technology and various methods has raised application range of these designs. Modified design tubes are having great applications due to their large heat transfer area and high heat transfer coefficients. They are used in many industrial processes like waste water treatment, refrigeration, wine and beer making, petroleum refining\begin{figure}[htbp]
\noindent\textbf{6}\includegraphics[]{image-2.png}
\caption{\label{fig_0}6 =??}\end{figure}
 \begin{figure}[htbp]
\noindent\textbf{1}\includegraphics[]{image-3.png}
\caption{\label{fig_1}T 1 =}\end{figure}
 \begin{figure}[htbp]
\noindent\textbf{}\includegraphics[]{image-4.png}
\caption{\label{fig_2}}\end{figure}
 \begin{figure}[htbp]
\noindent\textbf{}\includegraphics[]{image-5.png}
\caption{\label{fig_3}?}\end{figure}
 			\footnote{© 2015 Global Journals Inc. (US)} 			\footnote{© 20 15 Global Journals Inc. (US)} 			\footnote{© 20 15 Global Journals (US)} 		 		\backmatter  			  				\begin{bibitemlist}{1}
\bibitem[Gentry]{b9}\label{b9} 	 		\textit{},  		 			C C Gentry 		.  	 	 		\textit{Chem. Engng. Progress}  		86  (7)  p. .  	 
\bibitem[Small and Young ()]{b7}\label{b7} 	 		\textit{},  		 			W M Small 		,  		 			R K Young 		.  	 	 		\textit{Heat Transfer Engineering}  		1979. 1.  	 
\bibitem[Butterworth et al.]{b6}\label{b6} 	 		\textit{Design and Application of Twisted Tube Heat Exchangers},  		 			D Butterworth 		,  		 			A R Guy 		,  		 			J J Welkey 		.  		 	 
\bibitem[Effectively Design Shell-and-Tube Heat Exchangers, CHEMICAL ENGINEERING PROGRESS ()]{b2}\label{b2} 	 		\textit{Effectively Design Shell-and-Tube Heat Exchangers, CHEMICAL ENGINEERING PROGRESS},  		FEBRUARY 1998.  	 
\bibitem[Standards of the Tubular Exchanger Manufacturers' Association ()]{b5}\label{b5} 	 		\textit{Standards of the Tubular Exchanger Manufacturers' Association},  		1988. New York.  		 			TEMA 		 	 	 (th ed) 
\bibitem[Sriharsha et al. (2012)]{b0}\label{b0} 	 		\textit{Strength Analysis of Tube to Tube Sheet Joint in Shell and Tube Heat Exchanger},  		 			Kotcherla Sriharsha 		,  		 			Ramesh Venkata 		,  		 			Mamilla 		.  		October 2012. 1.  	 
\bibitem[Vikil et al. (2013)]{b4}\label{b4} 	 		\textit{Thermal Analysis of Heat Transferring Components in the Power Plant -A Review},  		 			D Vikil 		,  		 			M B Malwe 		,  		 			Mawale 		.  		January-2013. 2.  	 
\bibitem[Haran and Reddy (2013)]{b1}\label{b1} 	 		\textit{Thermal Analysis of Shell and Tube Heat Ex-Changer Using C and Ansys', (IJCTT) -volume},  		 			Ravindra Haran 		,  		 			Reddy 		.  		July 2013. 4.  	 
\bibitem[Patel (2012)]{b3}\label{b3} 	 		\textit{Thermal Analysis Of Tubular Heat Exchanger By Using Ansys},  		 			Paresh Patel 		.  		October -2012. 1.  	 
\bibitem[Patel (2012)]{b8}\label{b8} 	 		‘Thermal Analysis Of Tubular Heat Exchanger By Using Ansys’.  		 			Paresh Patel 		.  	 	 		\textit{Proc. IJERT},  				 (IJERT)  		October 2012. 1.  	 
\end{bibitemlist}
 			 		 	 
\end{document}
