\documentclass[11pt,twoside]{article}\makeatletter

\IfFileExists{xcolor.sty}%
  {\RequirePackage{xcolor}}%
  {\RequirePackage{color}}
\usepackage{colortbl}
\usepackage{wrapfig}
\usepackage{ifxetex}
\ifxetex
  \usepackage{fontspec}
  \usepackage{xunicode}
  \catcode`⃥=\active \def⃥{\textbackslash}
  \catcode`❴=\active \def❴{\{}
  \catcode`❵=\active \def❵{\}}
  \def\textJapanese{\fontspec{Noto Sans CJK JP}}
  \def\textChinese{\fontspec{Noto Sans CJK SC}}
  \def\textKorean{\fontspec{Noto Sans CJK KR}}
  \setmonofont{DejaVu Sans Mono}
  
\else
  \IfFileExists{utf8x.def}%
   {\usepackage[utf8x]{inputenc}
      \PrerenderUnicode{–}
    }%
   {\usepackage[utf8]{inputenc}}
  \usepackage[english]{babel}
  \usepackage[T1]{fontenc}
  \usepackage{float}
  \usepackage[]{ucs}
  \uc@dclc{8421}{default}{\textbackslash }
  \uc@dclc{10100}{default}{\{}
  \uc@dclc{10101}{default}{\}}
  \uc@dclc{8491}{default}{\AA{}}
  \uc@dclc{8239}{default}{\,}
  \uc@dclc{20154}{default}{ }
  \uc@dclc{10148}{default}{>}
  \def\textschwa{\rotatebox{-90}{e}}
  \def\textJapanese{}
  \def\textChinese{}
  \IfFileExists{tipa.sty}{\usepackage{tipa}}{}
\fi
\def\exampleFont{\ttfamily\small}
\DeclareTextSymbol{\textpi}{OML}{25}
\usepackage{relsize}
\RequirePackage{array}
\def\@testpach{\@chclass
 \ifnum \@lastchclass=6 \@ne \@chnum \@ne \else
  \ifnum \@lastchclass=7 5 \else
   \ifnum \@lastchclass=8 \tw@ \else
    \ifnum \@lastchclass=9 \thr@@
   \else \z@
   \ifnum \@lastchclass = 10 \else
   \edef\@nextchar{\expandafter\string\@nextchar}%
   \@chnum
   \if \@nextchar c\z@ \else
    \if \@nextchar l\@ne \else
     \if \@nextchar r\tw@ \else
   \z@ \@chclass
   \if\@nextchar |\@ne \else
    \if \@nextchar !6 \else
     \if \@nextchar @7 \else
      \if \@nextchar (8 \else
       \if \@nextchar )9 \else
  10
  \@chnum
  \if \@nextchar m\thr@@\else
   \if \@nextchar p4 \else
    \if \@nextchar b5 \else
   \z@ \@chclass \z@ \@preamerr \z@ \fi \fi \fi \fi
   \fi \fi  \fi  \fi  \fi  \fi  \fi \fi \fi \fi \fi \fi}
\gdef\arraybackslash{\let\\=\@arraycr}
\def\@textsubscript#1{{\m@th\ensuremath{_{\mbox{\fontsize\sf@size\z@#1}}}}}
\def\Panel#1#2#3#4{\multicolumn{#3}{){\columncolor{#2}}#4}{#1}}
\def\abbr{}
\def\corr{}
\def\expan{}
\def\gap{}
\def\orig{}
\def\reg{}
\def\ref{}
\def\sic{}
\def\persName{}\def\name{}
\def\placeName{}
\def\orgName{}
\def\textcal#1{{\fontspec{Lucida Calligraphy}#1}}
\def\textgothic#1{{\fontspec{Lucida Blackletter}#1}}
\def\textlarge#1{{\large #1}}
\def\textoverbar#1{\ensuremath{\overline{#1}}}
\def\textquoted#1{‘#1’}
\def\textsmall#1{{\small #1}}
\def\textsubscript#1{\@textsubscript{\selectfont#1}}
\def\textxi{\ensuremath{\xi}}
\def\titlem{\itshape}
\newenvironment{biblfree}{}{\ifvmode\par\fi }
\newenvironment{bibl}{}{}
\newenvironment{byline}{\vskip6pt\itshape\fontsize{16pt}{18pt}\selectfont}{\par }
\newenvironment{citbibl}{}{\ifvmode\par\fi }
\newenvironment{docAuthor}{\ifvmode\vskip4pt\fontsize{16pt}{18pt}\selectfont\fi\itshape}{\ifvmode\par\fi }
\newenvironment{docDate}{}{\ifvmode\par\fi }
\newenvironment{docImprint}{\vskip 6pt}{\ifvmode\par\fi }
\newenvironment{docTitle}{\vskip6pt\bfseries\fontsize{22pt}{25pt}\selectfont}{\par }
\newenvironment{msHead}{\vskip 6pt}{\par}
\newenvironment{msItem}{\vskip 6pt}{\par}
\newenvironment{rubric}{}{}
\newenvironment{titlePart}{}{\par }

\newcolumntype{L}[1]{){\raggedright\arraybackslash}p{#1}}
\newcolumntype{C}[1]{){\centering\arraybackslash}p{#1}}
\newcolumntype{R}[1]{){\raggedleft\arraybackslash}p{#1}}
\newcolumntype{P}[1]{){\arraybackslash}p{#1}}
\newcolumntype{B}[1]{){\arraybackslash}b{#1}}
\newcolumntype{M}[1]{){\arraybackslash}m{#1}}
\definecolor{label}{gray}{0.75}
\def\unusedattribute#1{\sout{\textcolor{label}{#1}}}
\DeclareRobustCommand*{\xref}{\hyper@normalise\xref@}
\def\xref@#1#2{\hyper@linkurl{#2}{#1}}
\begingroup
\catcode`\_=\active
\gdef_#1{\ensuremath{\sb{\mathrm{#1}}}}
\endgroup
\mathcode`\_=\string"8000
\catcode`\_=12\relax

\usepackage[a4paper,twoside,lmargin=1in,rmargin=1in,tmargin=1in,bmargin=1in,marginparwidth=0.75in]{geometry}
\usepackage{framed}

\definecolor{shadecolor}{gray}{0.95}
\usepackage{longtable}
\usepackage[normalem]{ulem}
\usepackage{fancyvrb}
\usepackage{fancyhdr}
\usepackage{graphicx}
\usepackage{marginnote}

\renewcommand{\@cite}[1]{#1}


\renewcommand*{\marginfont}{\itshape\footnotesize}

\def\Gin@extensions{.pdf,.png,.jpg,.mps,.tif}

  \pagestyle{fancy}

\usepackage[pdftitle={Reliability Evaluation of Composite System with Aging Failuire},
 pdfauthor={}]{hyperref}
\hyperbaseurl{}

	 \paperwidth210mm
	 \paperheight297mm
              
\def\@pnumwidth{1.55em}
\def\@tocrmarg {2.55em}
\def\@dotsep{4.5}
\setcounter{tocdepth}{3}
\clubpenalty=8000
\emergencystretch 3em
\hbadness=4000
\hyphenpenalty=400
\pretolerance=750
\tolerance=2000
\vbadness=4000
\widowpenalty=10000

\renewcommand\section{\@startsection {section}{1}{\z@}%
     {-1.75ex \@plus -0.5ex \@minus -.2ex}%
     {0.5ex \@plus .2ex}%
     {\reset@font\Large\bfseries}}
\renewcommand\subsection{\@startsection{subsection}{2}{\z@}%
     {-1.75ex\@plus -0.5ex \@minus- .2ex}%
     {0.5ex \@plus .2ex}%
     {\reset@font\Large}}
\renewcommand\subsubsection{\@startsection{subsubsection}{3}{\z@}%
     {-1.5ex\@plus -0.35ex \@minus -.2ex}%
     {0.5ex \@plus .2ex}%
     {\reset@font\large}}
\renewcommand\paragraph{\@startsection{paragraph}{4}{\z@}%
     {-1ex \@plus-0.35ex \@minus -0.2ex}%
     {0.5ex \@plus .2ex}%
     {\reset@font\normalsize}}
\renewcommand\subparagraph{\@startsection{subparagraph}{5}{\parindent}%
     {1.5ex \@plus1ex \@minus .2ex}%
     {-1em}%
     {\reset@font\normalsize\bfseries}}


\def\l@section#1#2{\addpenalty{\@secpenalty} \addvspace{1.0em plus 1pt}
 \@tempdima 1.5em \begingroup
 \parindent \z@ \rightskip \@pnumwidth 
 \parfillskip -\@pnumwidth 
 \bfseries \leavevmode #1\hfil \hbox to\@pnumwidth{\hss #2}\par
 \endgroup}
\def\l@subsection{\@dottedtocline{2}{1.5em}{2.3em}}
\def\l@subsubsection{\@dottedtocline{3}{3.8em}{3.2em}}
\def\l@paragraph{\@dottedtocline{4}{7.0em}{4.1em}}
\def\l@subparagraph{\@dottedtocline{5}{10em}{5em}}
\@ifundefined{c@section}{\newcounter{section}}{}
\@ifundefined{c@chapter}{\newcounter{chapter}}{}
\newif\if@mainmatter 
\@mainmattertrue
\def\chaptername{Chapter}
\def\frontmatter{%
  \pagenumbering{roman}
  \def\thechapter{\@roman\c@chapter}
  \def\theHchapter{\roman{chapter}}
  \def\thesection{\@roman\c@section}
  \def\theHsection{\roman{section}}
  \def\@chapapp{}%
}
\def\mainmatter{%
  \cleardoublepage
  \def\thechapter{\@arabic\c@chapter}
  \setcounter{chapter}{0}
  \setcounter{section}{0}
  \pagenumbering{arabic}
  \setcounter{secnumdepth}{6}
  \def\@chapapp{\chaptername}%
  \def\theHchapter{\arabic{chapter}}
  \def\thesection{\@arabic\c@section}
  \def\theHsection{\arabic{section}}
}
\def\backmatter{%
  \cleardoublepage
  \setcounter{chapter}{0}
  \setcounter{section}{0}
  \setcounter{secnumdepth}{2}
  \def\@chapapp{\appendixname}%
  \def\thechapter{\@Alph\c@chapter}
  \def\theHchapter{\Alph{chapter}}
  \appendix
}
\newenvironment{bibitemlist}[1]{%
   \list{\@biblabel{\@arabic\c@enumiv}}%
       {\settowidth\labelwidth{\@biblabel{#1}}%
        \leftmargin\labelwidth
        \advance\leftmargin\labelsep
        \@openbib@code
        \usecounter{enumiv}%
        \let\p@enumiv\@empty
        \renewcommand\theenumiv{\@arabic\c@enumiv}%
	}%
  \sloppy
  \clubpenalty4000
  \@clubpenalty \clubpenalty
  \widowpenalty4000%
  \sfcode`\.\@m}%
  {\def\@noitemerr
    {\@latex@warning{Empty `bibitemlist' environment}}%
    \endlist}

\def\tableofcontents{\section*{\contentsname}\@starttoc{toc}}
\parskip0pt
\parindent1em
\def\Panel#1#2#3#4{\multicolumn{#3}{){\columncolor{#2}}#4}{#1}}
\newenvironment{reflist}{%
  \begin{raggedright}\begin{list}{}
  {%
   \setlength{\topsep}{0pt}%
   \setlength{\rightmargin}{0.25in}%
   \setlength{\itemsep}{0pt}%
   \setlength{\itemindent}{0pt}%
   \setlength{\parskip}{0pt}%
   \setlength{\parsep}{2pt}%
   \def\makelabel##1{\itshape ##1}}%
  }
  {\end{list}\end{raggedright}}
\newenvironment{sansreflist}{%
  \begin{raggedright}\begin{list}{}
  {%
   \setlength{\topsep}{0pt}%
   \setlength{\rightmargin}{0.25in}%
   \setlength{\itemindent}{0pt}%
   \setlength{\parskip}{0pt}%
   \setlength{\itemsep}{0pt}%
   \setlength{\parsep}{2pt}%
   \def\makelabel##1{\upshape ##1}}%
  }
  {\end{list}\end{raggedright}}
\newenvironment{specHead}[2]%
 {\vspace{20pt}\hrule\vspace{10pt}%
  \phantomsection\label{#1}\markright{#2}%

  \pdfbookmark[2]{#2}{#1}%
  \hspace{-0.75in}{\bfseries\fontsize{16pt}{18pt}\selectfont#2}%
  }{}
      \def\TheFullDate{2012-03-15 (revised: 15 March 2012)}
\def\TheID{\makeatother }
\def\TheDate{2012-03-15}
\title{Reliability Evaluation of Composite System with Aging Failuire}
\author{}\makeatletter 
\makeatletter
\newcommand*{\cleartoleftpage}{%
  \clearpage
    \if@twoside
    \ifodd\c@page
      \hbox{}\newpage
      \if@twocolumn
        \hbox{}\newpage
      \fi
    \fi
  \fi
}
\makeatother
\makeatletter
\thispagestyle{empty}
\markright{\@title}\markboth{\@title}{\@author}
\renewcommand\small{\@setfontsize\small{9pt}{11pt}\abovedisplayskip 8.5\p@ plus3\p@ minus4\p@
\belowdisplayskip \abovedisplayskip
\abovedisplayshortskip \z@ plus2\p@
\belowdisplayshortskip 4\p@ plus2\p@ minus2\p@
\def\@listi{\leftmargin\leftmargini
               \topsep 2\p@ plus1\p@ minus1\p@
               \parsep 2\p@ plus\p@ minus\p@
               \itemsep 1pt}
}
\makeatother
\fvset{frame=single,numberblanklines=false,xleftmargin=5mm,xrightmargin=5mm}
\fancyhf{} 
\setlength{\headheight}{14pt}
\fancyhead[LE]{\bfseries\leftmark} 
\fancyhead[RO]{\bfseries\rightmark} 
\fancyfoot[RO]{}
\fancyfoot[CO]{\thepage}
\fancyfoot[LO]{\TheID}
\fancyfoot[LE]{}
\fancyfoot[CE]{\thepage}
\fancyfoot[RE]{\TheID}
\hypersetup{citebordercolor=0.75 0.75 0.75,linkbordercolor=0.75 0.75 0.75,urlbordercolor=0.75 0.75 0.75,bookmarksnumbered=true}
\fancypagestyle{plain}{\fancyhead{}\renewcommand{\headrulewidth}{0pt}}

\date{}
\usepackage{authblk}

\providecommand{\keywords}[1]
{
\footnotesize
  \textbf{\textit{Index terms---}} #1
}

\usepackage{graphicx,xcolor}
\definecolor{GJBlue}{HTML}{273B81}
\definecolor{GJLightBlue}{HTML}{0A9DD9}
\definecolor{GJMediumGrey}{HTML}{6D6E70}
\definecolor{GJLightGrey}{HTML}{929497} 

\renewenvironment{abstract}{%
   \setlength{\parindent}{0pt}\raggedright
   \textcolor{GJMediumGrey}{\rule{\textwidth}{2pt}}
   \vskip16pt
   \textcolor{GJBlue}{\large\bfseries\abstractname\space}
}{%   
   \vskip8pt
   \textcolor{GJMediumGrey}{\rule{\textwidth}{2pt}}
   \vskip16pt
}

\usepackage[absolute,overlay]{textpos}

\makeatother 
      \usepackage{lineno}
      \linenumbers
      
\begin{document}

             \author[1]{Dr. Tanay  Lakshman}

             \affil[1]{  Assistant Professor, EEE, SETGOI, Durgapur, West Bengal.}

\renewcommand\Authands{ and }

\date{\small \em Received: 6 February 2012 Accepted: 4 March 2012 Published: 15 March 2012}

\maketitle


\begin{abstract}
        


Reliability is concerned with the system capability of survival. In the past forty years, customer expectations have been increasing in response to evolving new technologies. As part of these evolutions, they are demanding from their suppliers: products with higher quality, low initial cost, improved customer support and products that are easy and inexpensive to maintain. For a supplier to survive, succeed and be profitable in today's market, It must do the following: a) Constant improvement in the quality of the products. b) Minimization of the cost. c) Be flexible and responsive to the customer's requirement.This deals with reliability evaluation of combined generation and transmission system known as composite system. It describes a technique calculate composite system reliability with aging failure.

\end{abstract}


\keywords{Power System Reliability, Transmission, Generation}

\begin{textblock*}{18cm}(1cm,1cm) % {block width} (coords) 
\textcolor{GJBlue}{\LARGE Global Journals \LaTeX\ JournalKaleidoscope\texttrademark}
\end{textblock*}

\begin{textblock*}{18cm}(1.4cm,1.5cm) % {block width} (coords) 
\textcolor{GJBlue}{\footnotesize \\ Artificial Intelligence formulated this projection for compatibility purposes from the original article published at Global Journals. However, this technology is currently in beta. \emph{Therefore, kindly ignore odd layouts, missed formulae, text, tables, or figures.}}
\end{textblock*}


\let\tabcellsep& 	 	 		 
\section[{Introduction}]{Introduction}\par
eliability is concerned with the system capability of survival. In the past twenty years, customer expectations have been increasing in response to evolving new technologies. As part of these evolution, they are demanding from their suppliers: a) Constant improvement in the quality of the products. b) Minimization of the cost. c) Be flexible and responsive to the customers' requirement.\par
Previously the criteria and techniques used for reliability assessment were all deterministically based. The essential weakness was that they did not account for the probabilistic or stochastic nature of system behaviour and component failures. However, the Author : Assistant Professor, EEE, SETGOI, Durgapur, West Bengal. E-mail : tana\textunderscore lakshman@yahoo.co.in probability theory alone cannot predict either the reliability or safety of the equipment. It is only a tool available to the engineer in order to transform his knowledge of the system for the prediction of future behaviour of the system. 
\section[{II.}]{II.} 
\section[{Objectives}]{Objectives}\par
So basic Objective is to calculate EENS value of loads connected to the system with Skm's PTW 6.5 . 
\section[{III.}]{III.} 
\section[{Methods}]{Methods}\par
The RBTS is a 6 bus system composed of two generator buses, 5 load buses, 9 transmission lines and 11 generating units. The total installed capacity is 240 MW and the system peak load is 185 MW. ear 2012 Y Products with higher quality, low initial cost, improved customer support and products those are easy and inexpensive to maintain. For a supplier to survive, succeed and be profitable in today's market, it must do the following: a) Rbts Data Table  {\ref 1} : Bus Data for RBTS system b) Generation Data Table  {\ref 2} : Generator data for RBTS system c) Rbts-Transmission Data\par
The relevant reliability data for the nine 110 kV lines in Fig. \hyperref[fig_0]{1} in terms of the permanent and transient failure rates and the permanent outage repair times are given in  {\ref [11]}. The outage duration of a transient outage is considered to be less than one minute. Outages of substation components which are not switched as a part of a line are not included in the line data.      A nonrepairable chance failure refers to a random basin curve. Obviously, it corresponds to a constant failure rate and therefore can be modeled using an exponential distribution. fatal failure in the normal operating stage of the life. A nonrepairable wear out failure refers to a random fatal failure in the normal operating stage of the life basin curve. Obviously, it corresponds to a increasing failure rate and therefore can be modeled using an exponential distribution. ? ? ? )))) 1 t ? ? ? ? ? ? ? ? ? ? ? ? ? ? ? ? ? ? ? ? ? ( ? ? Time(hr) ? =0.5 ? =1.0 ? =1. 
\section[{Results \& Discussion}]{Results \& Discussion}\par
From the Reliabilty analysis we get the life basin curve by plotting EENS value with time for ? =0.5, ? =1.0, ? =1.5. 
\section[{V.}]{V.}\par
Discussion And Conclusions to calculate reliability of composite system by calculating probability and frequency of failure of system under different conditions. This area of composite power system reliability evaluation is least developed and also one of the most complicated but in view of environmental, ecological, societal and economic constraints faced by most of power utilities, this area is developing and getting attention in international market.\begin{figure}[htbp]
\noindent\textbf{1}\includegraphics[]{image-2.png}
\caption{\label{fig_0}Figure 1 :}\end{figure}
 \begin{figure}[htbp]
\noindent\textbf{25}\includegraphics[]{image-3.png}
\caption{\label{fig_1}Figure 2 : 5 A}\end{figure}
 \begin{figure}[htbp]
\noindent\textbf{}\includegraphics[]{image-4.png}
\caption{\label{fig_2}}\end{figure}
 \begin{figure}[htbp]
\noindent\textbf{3} \par 
\begin{longtable}{P{0.85\textwidth}}
Reliability Evaluation of Composite System with Aging Failuire\end{longtable} \par
  {\small\itshape [Note: F © 2012 Global Journals Inc. (US)]} 
\caption{\label{tab_0}Table 3 :}\end{figure}
 \begin{figure}[htbp]
\noindent\textbf{4} \par 
\begin{longtable}{}
\end{longtable} \par
 
\caption{\label{tab_1}Table 4 :}\end{figure}
 \begin{figure}[htbp]
\noindent\textbf{5} \par 
\begin{longtable}{P{0.85\textwidth}}
: Load Reliability Data\end{longtable} \par
 
\caption{\label{tab_2}Table 5}\end{figure}
 \begin{figure}[htbp]
\noindent\textbf{6} \par 
\begin{longtable}{P{0.4061576354679803\textwidth}P{0.13399014778325122\textwidth}P{0.30985221674876845\textwidth}}
e) Aging Repair Rate The Value of\tabcellsep is calculated from the following\tabcellsep Repair Rate Calculation Formula =\\
\multicolumn{2}{l}{formula: = 1000000/(Failure Rate*EXP(GAMMALN(1+1/Shape Parameter}\tabcellsep Where = Scale parameter = Shape parameter\end{longtable} \par
 
\caption{\label{tab_3}Table 6 :}\end{figure}
 \begin{figure}[htbp]
\noindent\textbf{7} \par 
\begin{longtable}{P{0.85\textwidth}}
5\end{longtable} \par
 
\caption{\label{tab_4}Table 7 :}\end{figure}
 \begin{figure}[htbp]
\noindent\textbf{8} \par 
\begin{longtable}{P{0.85\textwidth}}
=0.5\end{longtable} \par
 
\caption{\label{tab_5}Table 8 :}\end{figure}
 \begin{figure}[htbp]
\noindent\textbf{9} \par 
\begin{longtable}{P{0.034552845528455285\textwidth}P{0.5569918699186992\textwidth}P{0.09674796747967479\textwidth}P{0.0027642276422764228\textwidth}P{0.004146341463414634\textwidth}P{0.1547967479674797\textwidth}}
\tabcellsep ?\tabcellsep \tabcellsep \tabcellsep \\
\tabcellsep \tabcellsep \tabcellsep \tabcellsep ?\\
Time(hr)\tabcellsep \tabcellsep \multicolumn{4}{l}{Reliability Analysis EENS(Kwh/year) Value for Aging of Tx's for ? =1}\\
\tabcellsep L2\tabcellsep L3\tabcellsep L4\tabcellsep L5\tabcellsep L6\\
0\tabcellsep \multicolumn{4}{l}{8855688.94 820.60 2065266.86 81867494.39}\tabcellsep 95477314.39\\
1\tabcellsep \multicolumn{4}{l}{8855688.94 820.60 2065266.86 81867494.39}\tabcellsep 95477314.39\\
5\tabcellsep \multicolumn{4}{l}{8855688.94 820.60 2065266.86 81867494.39}\tabcellsep 95477314.39\\
10\tabcellsep \multicolumn{4}{l}{8855688.94 820.60 2065266.86 81867494.39}\tabcellsep 95477314.39\\
15\tabcellsep \multicolumn{4}{l}{8855688.94 820.60 2065266.86 81867494.39}\tabcellsep 95477314.39\\
20\tabcellsep \multicolumn{4}{l}{8855688.94 820.60 2065266.86 81867494.39}\tabcellsep 95477314.39\\
25\tabcellsep \multicolumn{4}{l}{8855688.94 820.60 2065266.86 81867494.39}\tabcellsep 95477314.39\\
30\tabcellsep \multicolumn{4}{l}{8855688.94 820.60 2065266.86 81867494.39}\tabcellsep 95477314.39\\
35\tabcellsep \multicolumn{4}{l}{8855688.94 820.60 2065266.86 81867494.39}\tabcellsep 95477314.39\\
40\tabcellsep \multicolumn{4}{l}{8855688.94 820.60 2065266.86 81867494.39}\tabcellsep 95477314.39\end{longtable} \par
 
\caption{\label{tab_7}Table 9 :}\end{figure}
 \begin{figure}[htbp]
\noindent\textbf{10} \par 
\begin{longtable}{P{0.85\textwidth}}
=1.5\end{longtable} \par
 
\caption{\label{tab_8}Table 10 :}\end{figure}
 		 		\backmatter   			  			  			  				\begin{bibitemlist}{1}
\bibitem[Adequacy Assessment Of Composite Generation And Transmission Systems Incorporating Wind Energy Conversion Systems ()]{b13}\label{b13} 	 		\textit{Adequacy Assessment Of Composite Generation And Transmission Systems Incorporating Wind Energy Conversion Systems},  		2010.  		 			Yi Gao-University Of Saskatchewan 		 	 
\bibitem[Mehta et al. (2009)]{b0}\label{b0} 	 		\textit{Application of Reliability Analysis In Expansion Of Transmission System},  		 			A K Mehta 		,  		 			Dipak Ray 		,  		 			Kesab Bhattacharya 		.  		May, 2009. Academy Publisher. 1.  	 
\bibitem[Mehta et al. (2009)]{b1}\label{b1} 	 		\textit{Application of Reliability Analysis In Expansion Of Transmission System},  		 			A K Mehta 		,  		 			Dipak Ray 		,  		 			Kesab Bhattacharya 		.  		May, 2009. Academy Publisher. 1.  	 
\bibitem[Bulk System Reliability Evaluation In A Deregulated Power Industry-Yifeng Li ()]{b7}\label{b7} 	 		\textit{Bulk System Reliability Evaluation In A Deregulated Power Industry-Yifeng Li},  		2003.  		 			University Of Saskatchewan 		 	 
\bibitem[Development of Test System for Distribution System Reliability Analysis, Integration of Electric Vehicl into the Distribution System-Pramod Bangalore ()]{b11}\label{b11} 	 		\textit{Development of Test System for Distribution System Reliability Analysis, Integration of Electric Vehicl into the Distribution System-Pramod Bangalore},  		2011. Sweden.  		 			Chalmers University Of Technology Goteborg 		 	 
\bibitem[Incorporating Station Related Maintenance And Aging Outages In Composite System Reliability Evaluation-Hua Yang ()]{b6}\label{b6} 	 		\textit{Incorporating Station Related Maintenance And Aging Outages In Composite System Reliability Evaluation-Hua Yang},  		2005.  		 			University Of Saskatchewan 		 	 
\bibitem[Incorporating Substation And Switching Station Related Outages In Composite System Reliability Evaluation-Rajesh ()]{b8}\label{b8} 	 		\textit{Incorporating Substation And Switching Station Related Outages In Composite System Reliability Evaluation-Rajesh},  		2003.  		 			U Nighot-University Of Saskatchewan 		 	 
\bibitem[Maintenance Management In Power Systems-Matti Lehtonen (2007)]{b2}\label{b2} 	 		\textit{Maintenance Management In Power Systems-Matti Lehtonen},  		July 2007.  		 			Helsinki Univeristy Of Technology 		 	 	 (Kungliga Tekniska Hogs kolan) 
\bibitem[Optimization And Implementation Of Maintenance Schedules Of Power-Yang Fan ()]{b5}\label{b5} 	 		\textit{Optimization And Implementation Of Maintenance Schedules Of Power-Yang Fan},  		2011.  		 			National University Of Singapore 		 	 
\bibitem[Power System Reliabilityassessment Using The Weibull-Markov Model-Jasper Van Casteren ()]{b4}\label{b4} 	 		\textit{Power System Reliabilityassessment Using The Weibull-Markov Model-Jasper Van Casteren},  		2001.  		 			Chalmers University Of Technology 		 	 
\bibitem[Reliability Analysis And Economic Equipment Replacement Appraisal For Substation And Sub]{b10}\label{b10} 	 		\textit{Reliability Analysis And Economic Equipment Replacement Appraisal For Substation And Sub},  		 	 
\bibitem[Reliability Assessment of Complex Power Systems and the Use of NEPLAN Tool-Shima Mousavi Gargari-Royal Institute of Technology, KTH ()]{b12}\label{b12} 	 		\textit{Reliability Assessment of Complex Power Systems and the Use of NEPLAN Tool-Shima Mousavi Gargari-Royal Institute of Technology, KTH},  		2006.  	 
\bibitem[Test Systems For Reliability And Adequacy Assessment Of Electric Power Systems-Roy Billinton ()]{b9}\label{b9} 	 		\textit{Test Systems For Reliability And Adequacy Assessment Of Electric Power Systems-Roy Billinton},  		2010. Dange Huang.  		 			University Of Saskatchewan 		 	 
\bibitem[Verification Of The Transmission System Model Rbts Using Monte Carlo Simulation Methods-KTH, The Royal Institute Of Technology School Of Electrical Engineering ()]{b3}\label{b3} 	 		‘Verification Of The Transmission System Model Rbts Using Monte Carlo Simulation Methods-KTH, The Royal Institute Of Technology’.  	 	 		\textit{School Of Electrical Engineering}  		2008.  	 
\end{bibitemlist}
 			 		 	 
\end{document}
