\documentclass[11pt,twoside]{article}\makeatletter

\IfFileExists{xcolor.sty}%
  {\RequirePackage{xcolor}}%
  {\RequirePackage{color}}
\usepackage{colortbl}
\usepackage{wrapfig}
\usepackage{ifxetex}
\ifxetex
  \usepackage{fontspec}
  \usepackage{xunicode}
  \catcode`⃥=\active \def⃥{\textbackslash}
  \catcode`❴=\active \def❴{\{}
  \catcode`❵=\active \def❵{\}}
  \def\textJapanese{\fontspec{Noto Sans CJK JP}}
  \def\textChinese{\fontspec{Noto Sans CJK SC}}
  \def\textKorean{\fontspec{Noto Sans CJK KR}}
  \setmonofont{DejaVu Sans Mono}
  
\else
  \IfFileExists{utf8x.def}%
   {\usepackage[utf8x]{inputenc}
      \PrerenderUnicode{–}
    }%
   {\usepackage[utf8]{inputenc}}
  \usepackage[english]{babel}
  \usepackage[T1]{fontenc}
  \usepackage{float}
  \usepackage[]{ucs}
  \uc@dclc{8421}{default}{\textbackslash }
  \uc@dclc{10100}{default}{\{}
  \uc@dclc{10101}{default}{\}}
  \uc@dclc{8491}{default}{\AA{}}
  \uc@dclc{8239}{default}{\,}
  \uc@dclc{20154}{default}{ }
  \uc@dclc{10148}{default}{>}
  \def\textschwa{\rotatebox{-90}{e}}
  \def\textJapanese{}
  \def\textChinese{}
  \IfFileExists{tipa.sty}{\usepackage{tipa}}{}
\fi
\def\exampleFont{\ttfamily\small}
\DeclareTextSymbol{\textpi}{OML}{25}
\usepackage{relsize}
\RequirePackage{array}
\def\@testpach{\@chclass
 \ifnum \@lastchclass=6 \@ne \@chnum \@ne \else
  \ifnum \@lastchclass=7 5 \else
   \ifnum \@lastchclass=8 \tw@ \else
    \ifnum \@lastchclass=9 \thr@@
   \else \z@
   \ifnum \@lastchclass = 10 \else
   \edef\@nextchar{\expandafter\string\@nextchar}%
   \@chnum
   \if \@nextchar c\z@ \else
    \if \@nextchar l\@ne \else
     \if \@nextchar r\tw@ \else
   \z@ \@chclass
   \if\@nextchar |\@ne \else
    \if \@nextchar !6 \else
     \if \@nextchar @7 \else
      \if \@nextchar (8 \else
       \if \@nextchar )9 \else
  10
  \@chnum
  \if \@nextchar m\thr@@\else
   \if \@nextchar p4 \else
    \if \@nextchar b5 \else
   \z@ \@chclass \z@ \@preamerr \z@ \fi \fi \fi \fi
   \fi \fi  \fi  \fi  \fi  \fi  \fi \fi \fi \fi \fi \fi}
\gdef\arraybackslash{\let\\=\@arraycr}
\def\@textsubscript#1{{\m@th\ensuremath{_{\mbox{\fontsize\sf@size\z@#1}}}}}
\def\Panel#1#2#3#4{\multicolumn{#3}{){\columncolor{#2}}#4}{#1}}
\def\abbr{}
\def\corr{}
\def\expan{}
\def\gap{}
\def\orig{}
\def\reg{}
\def\ref{}
\def\sic{}
\def\persName{}\def\name{}
\def\placeName{}
\def\orgName{}
\def\textcal#1{{\fontspec{Lucida Calligraphy}#1}}
\def\textgothic#1{{\fontspec{Lucida Blackletter}#1}}
\def\textlarge#1{{\large #1}}
\def\textoverbar#1{\ensuremath{\overline{#1}}}
\def\textquoted#1{‘#1’}
\def\textsmall#1{{\small #1}}
\def\textsubscript#1{\@textsubscript{\selectfont#1}}
\def\textxi{\ensuremath{\xi}}
\def\titlem{\itshape}
\newenvironment{biblfree}{}{\ifvmode\par\fi }
\newenvironment{bibl}{}{}
\newenvironment{byline}{\vskip6pt\itshape\fontsize{16pt}{18pt}\selectfont}{\par }
\newenvironment{citbibl}{}{\ifvmode\par\fi }
\newenvironment{docAuthor}{\ifvmode\vskip4pt\fontsize{16pt}{18pt}\selectfont\fi\itshape}{\ifvmode\par\fi }
\newenvironment{docDate}{}{\ifvmode\par\fi }
\newenvironment{docImprint}{\vskip 6pt}{\ifvmode\par\fi }
\newenvironment{docTitle}{\vskip6pt\bfseries\fontsize{22pt}{25pt}\selectfont}{\par }
\newenvironment{msHead}{\vskip 6pt}{\par}
\newenvironment{msItem}{\vskip 6pt}{\par}
\newenvironment{rubric}{}{}
\newenvironment{titlePart}{}{\par }

\newcolumntype{L}[1]{){\raggedright\arraybackslash}p{#1}}
\newcolumntype{C}[1]{){\centering\arraybackslash}p{#1}}
\newcolumntype{R}[1]{){\raggedleft\arraybackslash}p{#1}}
\newcolumntype{P}[1]{){\arraybackslash}p{#1}}
\newcolumntype{B}[1]{){\arraybackslash}b{#1}}
\newcolumntype{M}[1]{){\arraybackslash}m{#1}}
\definecolor{label}{gray}{0.75}
\def\unusedattribute#1{\sout{\textcolor{label}{#1}}}
\DeclareRobustCommand*{\xref}{\hyper@normalise\xref@}
\def\xref@#1#2{\hyper@linkurl{#2}{#1}}
\begingroup
\catcode`\_=\active
\gdef_#1{\ensuremath{\sb{\mathrm{#1}}}}
\endgroup
\mathcode`\_=\string"8000
\catcode`\_=12\relax

\usepackage[a4paper,twoside,lmargin=1in,rmargin=1in,tmargin=1in,bmargin=1in,marginparwidth=0.75in]{geometry}
\usepackage{framed}

\definecolor{shadecolor}{gray}{0.95}
\usepackage{longtable}
\usepackage[normalem]{ulem}
\usepackage{fancyvrb}
\usepackage{fancyhdr}
\usepackage{graphicx}
\usepackage{marginnote}

\renewcommand{\@cite}[1]{#1}


\renewcommand*{\marginfont}{\itshape\footnotesize}

\def\Gin@extensions{.pdf,.png,.jpg,.mps,.tif}

  \pagestyle{fancy}

\usepackage[pdftitle={Home Automation using Raspberry PI},
 pdfauthor={}]{hyperref}
\hyperbaseurl{}

	 \paperwidth210mm
	 \paperheight297mm
              
\def\@pnumwidth{1.55em}
\def\@tocrmarg {2.55em}
\def\@dotsep{4.5}
\setcounter{tocdepth}{3}
\clubpenalty=8000
\emergencystretch 3em
\hbadness=4000
\hyphenpenalty=400
\pretolerance=750
\tolerance=2000
\vbadness=4000
\widowpenalty=10000

\renewcommand\section{\@startsection {section}{1}{\z@}%
     {-1.75ex \@plus -0.5ex \@minus -.2ex}%
     {0.5ex \@plus .2ex}%
     {\reset@font\Large\bfseries}}
\renewcommand\subsection{\@startsection{subsection}{2}{\z@}%
     {-1.75ex\@plus -0.5ex \@minus- .2ex}%
     {0.5ex \@plus .2ex}%
     {\reset@font\Large}}
\renewcommand\subsubsection{\@startsection{subsubsection}{3}{\z@}%
     {-1.5ex\@plus -0.35ex \@minus -.2ex}%
     {0.5ex \@plus .2ex}%
     {\reset@font\large}}
\renewcommand\paragraph{\@startsection{paragraph}{4}{\z@}%
     {-1ex \@plus-0.35ex \@minus -0.2ex}%
     {0.5ex \@plus .2ex}%
     {\reset@font\normalsize}}
\renewcommand\subparagraph{\@startsection{subparagraph}{5}{\parindent}%
     {1.5ex \@plus1ex \@minus .2ex}%
     {-1em}%
     {\reset@font\normalsize\bfseries}}


\def\l@section#1#2{\addpenalty{\@secpenalty} \addvspace{1.0em plus 1pt}
 \@tempdima 1.5em \begingroup
 \parindent \z@ \rightskip \@pnumwidth 
 \parfillskip -\@pnumwidth 
 \bfseries \leavevmode #1\hfil \hbox to\@pnumwidth{\hss #2}\par
 \endgroup}
\def\l@subsection{\@dottedtocline{2}{1.5em}{2.3em}}
\def\l@subsubsection{\@dottedtocline{3}{3.8em}{3.2em}}
\def\l@paragraph{\@dottedtocline{4}{7.0em}{4.1em}}
\def\l@subparagraph{\@dottedtocline{5}{10em}{5em}}
\@ifundefined{c@section}{\newcounter{section}}{}
\@ifundefined{c@chapter}{\newcounter{chapter}}{}
\newif\if@mainmatter 
\@mainmattertrue
\def\chaptername{Chapter}
\def\frontmatter{%
  \pagenumbering{roman}
  \def\thechapter{\@roman\c@chapter}
  \def\theHchapter{\roman{chapter}}
  \def\thesection{\@roman\c@section}
  \def\theHsection{\roman{section}}
  \def\@chapapp{}%
}
\def\mainmatter{%
  \cleardoublepage
  \def\thechapter{\@arabic\c@chapter}
  \setcounter{chapter}{0}
  \setcounter{section}{0}
  \pagenumbering{arabic}
  \setcounter{secnumdepth}{6}
  \def\@chapapp{\chaptername}%
  \def\theHchapter{\arabic{chapter}}
  \def\thesection{\@arabic\c@section}
  \def\theHsection{\arabic{section}}
}
\def\backmatter{%
  \cleardoublepage
  \setcounter{chapter}{0}
  \setcounter{section}{0}
  \setcounter{secnumdepth}{2}
  \def\@chapapp{\appendixname}%
  \def\thechapter{\@Alph\c@chapter}
  \def\theHchapter{\Alph{chapter}}
  \appendix
}
\newenvironment{bibitemlist}[1]{%
   \list{\@biblabel{\@arabic\c@enumiv}}%
       {\settowidth\labelwidth{\@biblabel{#1}}%
        \leftmargin\labelwidth
        \advance\leftmargin\labelsep
        \@openbib@code
        \usecounter{enumiv}%
        \let\p@enumiv\@empty
        \renewcommand\theenumiv{\@arabic\c@enumiv}%
	}%
  \sloppy
  \clubpenalty4000
  \@clubpenalty \clubpenalty
  \widowpenalty4000%
  \sfcode`\.\@m}%
  {\def\@noitemerr
    {\@latex@warning{Empty `bibitemlist' environment}}%
    \endlist}

\def\tableofcontents{\section*{\contentsname}\@starttoc{toc}}
\parskip0pt
\parindent1em
\def\Panel#1#2#3#4{\multicolumn{#3}{){\columncolor{#2}}#4}{#1}}
\newenvironment{reflist}{%
  \begin{raggedright}\begin{list}{}
  {%
   \setlength{\topsep}{0pt}%
   \setlength{\rightmargin}{0.25in}%
   \setlength{\itemsep}{0pt}%
   \setlength{\itemindent}{0pt}%
   \setlength{\parskip}{0pt}%
   \setlength{\parsep}{2pt}%
   \def\makelabel##1{\itshape ##1}}%
  }
  {\end{list}\end{raggedright}}
\newenvironment{sansreflist}{%
  \begin{raggedright}\begin{list}{}
  {%
   \setlength{\topsep}{0pt}%
   \setlength{\rightmargin}{0.25in}%
   \setlength{\itemindent}{0pt}%
   \setlength{\parskip}{0pt}%
   \setlength{\itemsep}{0pt}%
   \setlength{\parsep}{2pt}%
   \def\makelabel##1{\upshape ##1}}%
  }
  {\end{list}\end{raggedright}}
\newenvironment{specHead}[2]%
 {\vspace{20pt}\hrule\vspace{10pt}%
  \phantomsection\label{#1}\markright{#2}%

  \pdfbookmark[2]{#2}{#1}%
  \hspace{-0.75in}{\bfseries\fontsize{16pt}{18pt}\selectfont#2}%
  }{}
      \def\TheFullDate{2023 1970-01-01 (revised: 22 Year 2023 01 January 1970)}
\def\TheID{\makeatother }
\def\TheDate{2023 1970-01-01}
\title{Home Automation using Raspberry PI}
\author{}\makeatletter 
\makeatletter
\newcommand*{\cleartoleftpage}{%
  \clearpage
    \if@twoside
    \ifodd\c@page
      \hbox{}\newpage
      \if@twocolumn
        \hbox{}\newpage
      \fi
    \fi
  \fi
}
\makeatother
\makeatletter
\thispagestyle{empty}
\markright{\@title}\markboth{\@title}{\@author}
\renewcommand\small{\@setfontsize\small{9pt}{11pt}\abovedisplayskip 8.5\p@ plus3\p@ minus4\p@
\belowdisplayskip \abovedisplayskip
\abovedisplayshortskip \z@ plus2\p@
\belowdisplayshortskip 4\p@ plus2\p@ minus2\p@
\def\@listi{\leftmargin\leftmargini
               \topsep 2\p@ plus1\p@ minus1\p@
               \parsep 2\p@ plus\p@ minus\p@
               \itemsep 1pt}
}
\makeatother
\fvset{frame=single,numberblanklines=false,xleftmargin=5mm,xrightmargin=5mm}
\fancyhf{} 
\setlength{\headheight}{14pt}
\fancyhead[LE]{\bfseries\leftmark} 
\fancyhead[RO]{\bfseries\rightmark} 
\fancyfoot[RO]{}
\fancyfoot[CO]{\thepage}
\fancyfoot[LO]{\TheID}
\fancyfoot[LE]{}
\fancyfoot[CE]{\thepage}
\fancyfoot[RE]{\TheID}
\hypersetup{citebordercolor=0.75 0.75 0.75,linkbordercolor=0.75 0.75 0.75,urlbordercolor=0.75 0.75 0.75,bookmarksnumbered=true}
\fancypagestyle{plain}{\fancyhead{}\renewcommand{\headrulewidth}{0pt}}

\date{}
\usepackage{authblk}

\providecommand{\keywords}[1]
{
\footnotesize
  \textbf{\textit{Index terms---}} #1
}

\usepackage{graphicx,xcolor}
\definecolor{GJBlue}{HTML}{273B81}
\definecolor{GJLightBlue}{HTML}{0A9DD9}
\definecolor{GJMediumGrey}{HTML}{6D6E70}
\definecolor{GJLightGrey}{HTML}{929497} 

\renewenvironment{abstract}{%
   \setlength{\parindent}{0pt}\raggedright
   \textcolor{GJMediumGrey}{\rule{\textwidth}{2pt}}
   \vskip16pt
   \textcolor{GJBlue}{\large\bfseries\abstractname\space}
}{%   
   \vskip8pt
   \textcolor{GJMediumGrey}{\rule{\textwidth}{2pt}}
   \vskip16pt
}

\usepackage[absolute,overlay]{textpos}

\makeatother 
      \usepackage{lineno}
      \linenumbers
      
\begin{document}

             \author[1]{Syeda Jamala  Fatima}

\renewcommand\Authands{ and }

\date{\small \em Received: 1 January 1970 Accepted: 1 January 1970 Published: 1 January 1970}

\maketitle


\begin{abstract}
        


The home automation system based on the Raspberry Pi and Node MCU leverages house hold appliances and allows users to control them vi the internet from anywhere in the globe. It enables control and operation of appliances and gadgets in a house through communication between hardware and software. Home automation might lead to more effective and intelligent energy saving strategies. The main goal of this project is to build a home automation system using a Raspberry Pi and a Node MCU board, with the internet controlled by the Telegram application. With the Io idea, all household appliances and electrical equipment may be regulated automatically as well as manually via relay circuits.

\end{abstract}


\keywords{}

\begin{textblock*}{18cm}(1cm,1cm) % {block width} (coords) 
\textcolor{GJBlue}{\LARGE Global Journals \LaTeX\ JournalKaleidoscope\texttrademark}
\end{textblock*}

\begin{textblock*}{18cm}(1.4cm,1.5cm) % {block width} (coords) 
\textcolor{GJBlue}{\footnotesize \\ Artificial Intelligence formulated this projection for compatibility purposes from the original article published at Global Journals. However, this technology is currently in beta. \emph{Therefore, kindly ignore odd layouts, missed formulae, text, tables, or figures.}}
\end{textblock*}


\begin{textblock*}{10cm}(1.05cm,3cm)
{{\textit{CrossRef DOI of original article:}} \underline{}}
\end{textblock*}\let\tabcellsep& 	 	 		 
\section[{I. Introduction}]{I. Introduction}\par
he internet-based functioning of physical devices (also known as "connected devices" and "smart gadgets"), buildings, and other items integrated with electronics, software, sensors, actuators, and network connectivity, allowing these objects to gather and share data, is referred to as the Internet of Things (IoT). Home automation is defined as the interconnection of physical things via sensors and software. Network connections are used to acquire and share data. Home automation refers to the automated and electronic control of household features, activities, and appliances. Home automation systems are becoming more popular as a way to control objects around the house. All forms of home equipment, including doors, lights, fans, electric heaters, surveillance systems, and consumer electronics, are included in the household automation system. system. All electrical and electronic equipment and devices are monitored and controlled via the Telegram application. The rest of the paper is laid out as follows: Section II examines some key aspects of related works, section IV elucidates the proposed methodology, section V presents experimental results, and section VI concludes with a discussion of future work. 
\section[{II. Literature Survey}]{II. Literature Survey}\par
In [1] The project development includes an Internet of Things-based secure home access solution. Using the Raspberry Pi controller, camera, and numerous other connected sensors, this presents a smart, creative, and secure access. The system is a synthesis of all previous work, for which an IR sensor is used to identify objects, which then triggers a camera for facial recognition. The technology is intended for secure remote access and control of household equipment.\par
In \hyperref[b1]{[2]} A Smart Home Application with Wi-Fi module prototype and implementation are shown. As a Wi-Fi module, the ESP8266 is utilised. A hardware interface and a software interface make up the system. The integration of ESP8266 Wi-Fi technology for managing home appliances and sensors is represented in the hardware interface, and a software interface is given for controlling numerous users of the house. The output of this system is reached by utilising the blynk app for smart home automation. The temperature and humidity is depicted, along with a Wi-Fi connection. GSM and GPS modules are used to send messages on a mobile phone.\par
In \hyperref[b2]{[3]} The system provides smart wireless home security by sending an email with a photo to the house owner if intruders enter the residence and also by sounding an alert if a fire occurs. From anywhere in the world, the system can regulate and monitor the house temperature, humidity, flame status, and other home equipment. The technology updates data every three seconds, allowing speedy decisions to be made. The Picamera immediately sends an email with an intruder photo or a fire mishap to a concerned person, improving the safety of the property and the home owner. The system is also capable of controlling household appliances.\par
In \hyperref[b3]{[4]} The goal of the study is to create an IoTbased system that allows users to operate electrical appliances remotely using an Android mobile application. The mobile application was put to the test, and the reaction in terms of turning on/off appliances The goal of the home automation system is to automate the control of equipment and systems in the house by utilising existing technologies. This project shows a prototype of an intelligent home automation system that uses the Telegram application to operate household appliances, electrical equipment, and other devices from smart phones, computers, tablets, and other devices with an active internet connection. It will use relay circuits, Raspberry Pi, and Node MCU with the concept of IoT to turn on or off and operate household appliances and electrical equipment remotely as well as manually. Home automation offers a lot of promise for exchanging data among family members or trusted persons for personal security, and it might lead to energy-saving measures in the future. When one of these automated systems is used in a residential installation, it is referred to as a home automation and locking/unlocking doors was noticed. Thing Speak cloud provides a web access for monitoring data logs and signal transmission. The technology performed as intended in terms of lowering energy use.\par
In \hyperref[b5]{[5]} The appliances are managed by the Raspberry pi server, which runs according to the user command received from the phone through an android app. Smart home automation is suggested for the elderly, based on python, OpenCV, raspberry pi, and android applications. Face identification and recognition from a camera positioned outside the main door, which can be accessed from the phone, is used to create a unique door monitoring system. The hardware for regulating the intensity of light using the Raspberry Pi's PWM output is presented. For home security, an automatic door monitoring system based on an Android mobile is presented.\par
In \hyperref[b6]{[6]} Smart home automation particularly for old age people is proposed based on python, OpenCV, raspberry pi and android application, the appliances are controlled by the Raspberry pi server, which operates according to the user command received from the mobile phone. A unique door monitoring system is designed based on face detection and recognition from a camera installed outside the main door, which can be accessed from the phone using android application. The hardware implantation for controlling intensity of light using PWM output from Raspberry Pi is depicted. An automatic door monitoring system using USB camera, python, OpenCV, raspberry pi, and android device is proposed for monitoring and security purpose. IoT provides more flexible and low-cost solutions for daily life problems which ultimately improve the user's life. Although many previous researchers proposed many home automation systems by using different concepts, there are some reasons for the motivation to design an efficient home automation system. Previously proposed home automation systems are expensive and complex, Bluetooth based home automation systems required intrusive installation \hyperref[b6]{[6]} and some of the senior citizens does not use G-mail, Twitter or web server as it requires the account creation as well as additional wi-fi module \hyperref[b1]{[2,}\hyperref[b2]{3,}\hyperref[b5]{5}] and find it difficult to operate as it requires additional learning \hyperref[b3]{[4]}. 
\section[{III. Problem Statement}]{III. Problem Statement}\par
The high cost of ownership, inadequate administration, and difficulty in attaining security are the four primary issues that home automation systems confront. The main goal is to create and construct a lowcost, open-source home automation system that can manage and automate most household appliances using a simple interface. Our suggested system has a lot of versatility since it connects its modules to the Telegram Application utilizing wi-fi technology. Secure wireless communication protocols between user and telegram server, will be used in the system. 
\section[{IV. Methodology}]{IV. Methodology}\par
The System Architecture includes a set of hardware components such as the Raspberry Pi, Node MCU esp8266, MLX Sensor, and relays. As well as a set of software components like Raspbian operating system, Arduino IDE and Tele-gram application as shown in the figure  {\ref .} The system receives the commands from the user via the Telegram application. The command from the user can be received from anywhere through the internet. The Raspberry Pi and Node MCU process the instructions received and operates the loads (light and fan) to switch them ON/OFF and, the door lock to lock/unlock according to desired user commands respectively. Thus, we automate light, fan and door over the internet using Raspberry Pi and Node MCU. Raspberry Pi, Node MCU esp8266 hardware, MLX90614 sensor, and Telegram application are at the core of smart home automation. The system is divided into two halves based on Raspberry Pi and Node MCU. For the initial half, Because of its user-friendly features and costeffectiveness, the Raspberry Pi was chosen as the system's processing unit. A python-coded programming has also been put into the Raspberry Pi, which is connected to the internet through a wireless wi-fi interface and can access and send data to the Telegram application. The Household Electrical Devices to be monitored were interfaced with the Raspberry Pi using a relay driver circuit due to the different power ratings of the devices and the Raspberry Pi. The latter half contains the microcontroller, Node MCU esp8266 that connects the user to the door lock system through the Internet. This allows the user to lock or unlock the door lock from anywhere in the world using the Telegram application. The MLX sensor detects the person's body temperature and sends the information to the Telegram application through the Node MCU microcontroller embedded telegram server. 
\section[{a) Raspberry Pi}]{a) Raspberry Pi}\par
The Raspberry Pi is a credit card-sized computer that plugs into a computer monitor or TV and comes with a standard keyboard and mouse as shown in Fig. \hyperref[fig_3]{2}  Furthermore, by offering some of the most important microcontroller functions such as GPIO, PWM, ADC, and so on, it may be able to manage many of the project's demands on its own. The system's Node MCU esp8266 is shown in Fig. \hyperref[fig_4]{3}. The relay in Fig. \hyperref[fig_5]{4}, is essentially a control switch that employs electromagnetic to swap the switch, allowing it to be readily activated by a low voltage signal. It's utilised to keep the load from being supplied when it's needed. The motor is controlled by an electrical impulse, which may be activated in a number of ways, including an electronic card reader, a keypad, or a wireless remote control sensor, as shown in Fig. \hyperref[fig_6]{5}. The electronic door lock is configured to engage the motor-driven actuator only after receiving the right electrical input in either instance. It is a contactless infrared temperature sensor with exceptional precision. Due to its great accuracy and precision, it may be utilised in a number of business, health-care, and home applications, such as room temperature monitoring and body temperature measuring. The MLX90614 sensor, which is used to monitor body temperature, is shown in Fig. \hyperref[fig_7]{6}. Year 2023 (A )       
\section[{VI. Conclusion and Future Work}]{VI. Conclusion and Future Work}\par
The Raspberry Pi and Node MCU ESP8266 with internet through mobile phones, tablets, and computers have been operating effectively for home automation. Telegram notification is one of the proposed system's benefits. Telegram notifications are simple to use for older generations because they do not require an email address or a Twitter account. In addition to this, it has MLX sensor which can be used for detecting body temperature. The designed method is smart, inventive and secure, as well as low-power and inexpensive. It may be used to cut down on electricity waste by properly scheduling and monitoring equipment. The proposed system may be utilised to dramatically minimise the danger of unwanted entry in a range of places, including banks, hospitals, labs, and workplaces. The system might be enhanced in the future to include fan speed adjustment, smart doors with identification, and a voice assistant.\begin{figure}[htbp]
\noindent\textbf{2023}\includegraphics[]{image-2.png}
\caption{\label{fig_0}T © 2023}\end{figure}
 \begin{figure}[htbp]
\noindent\textbf{1}\includegraphics[]{image-3.png}
\caption{\label{fig_1}Figure 1 :}\end{figure}
 \begin{figure}[htbp]
\noindent\textbf{}\includegraphics[]{image-4.png}
\caption{\label{fig_2}}\end{figure}
 \begin{figure}[htbp]
\noindent\textbf{2}\includegraphics[]{image-5.png}
\caption{\label{fig_3}Figure 2 :}\end{figure}
 \begin{figure}[htbp]
\noindent\textbf{3}\includegraphics[]{image-6.png}
\caption{\label{fig_4}Figure 3 :}\end{figure}
 \begin{figure}[htbp]
\noindent\textbf{4}\includegraphics[]{image-7.png}
\caption{\label{fig_5}Figure 4 :}\end{figure}
 \begin{figure}[htbp]
\noindent\textbf{5}\includegraphics[]{image-8.png}
\caption{\label{fig_6}Figure 5 :}\end{figure}
 \begin{figure}[htbp]
\noindent\textbf{6}\includegraphics[]{image-9.png}
\caption{\label{fig_7}Figure 6 :}\end{figure}
 \begin{figure}[htbp]
\noindent\textbf{7}\includegraphics[]{image-10.png}
\caption{\label{fig_8}Figure 7 :}\end{figure}
 \begin{figure}[htbp]
\noindent\textbf{8}\includegraphics[]{image-11.png}
\caption{\label{fig_9}Figure 8 :}\end{figure}
 \begin{figure}[htbp]
\noindent\textbf{9}\includegraphics[]{image-12.png}
\caption{\label{fig_11}Figure 9 :}\end{figure}
 \begin{figure}[htbp]
\noindent\textbf{10}\includegraphics[]{image-13.png}
\caption{\label{fig_12}Figure 10 :}\end{figure}
 		 		\backmatter  			  				\begin{bibitemlist}{1}
\bibitem[Minhas ()]{b4}\label{b4} 	 		\textit{},  		 			Minhas 		.  		 \xref{http://dx.doi.org/10.1109/iCCECE46942.2019.8941737}{10.1109/iCCECE46942.2019.8941737}.  		2019.  	 
\bibitem[Statista Research Department ()]{b17}\label{b17} 	 		\textit{},  		 			Statista Research Department 		.  		 \url{https://www.statista.com/aboutus/ourresearch-commitment}  		2019.  	 
\bibitem[Guth ()]{b9}\label{b9} 	 		\textit{A Detailed Analysis of IOT Platform Architectures: Concepts, Similarities, and Differences},  		 			Jasmine Guth 		.  		2018. Springer-Verlag.  	 
\bibitem[Yukesekkaya et al. (2006)]{b20}\label{b20} 	 		‘A GSM, Internet and Speech Controlled Wireless Interactive Home Automation System’.  		 			B Yukesekkaya 		,  		 			A A Kayalar 		,  		 			M B Tosun 		,  		 			M K Ozcan 		,  		 			A Z Alkar 		.  	 	 		\textit{IEEE Transactions on Consumer Electronics}  		August 2006. 52 p. .  	 
\bibitem[Nakrani et al. ()]{b15}\label{b15} 	 		‘A review: Internet of things (IoT) based smart home automation’.  		 			V Nakrani 		,  		 			M Panchal 		,  		 			D Thakkar 		,  		 			S Pednekar 		,  		 			Y Mane 		.  	 	 		\textit{International Journal of Recent Trends in Engineering and Research}  		2017. 3  (3) .  	 
\bibitem[Domingo ()]{b18}\label{b18} 	 		‘An overview of the Internet of Things for people with disabilities’.  		 			M C Domingo 		.  	 	 		\textit{Journal of Network and Computer Applications}  		2012. 35  (2)  p. .  	 
\bibitem[Alheraish ()]{b7}\label{b7} 	 		‘Design and Implementation of Home Automation System’.  		 			A Alheraish 		.  	 	 		\textit{IEEE Trans. Consum. Electron}  		2004. 50  (4)  p. .  	 
\bibitem[C-C ()]{b12}\label{b12} 	 		‘Intelligent home energy conservation system based on WSN’.  		 			C. C-H 		,  		 			G C-C 		,  		 			C. J-J 		.  	 	 		\textit{International conference on electrical, electronics and civil engineering},  				 (Pattaya)  		2011.  	 
\bibitem[Pawar and Umale ()]{b14}\label{b14} 	 		‘Internet of Things Based Home Security Using Raspberry Pi’.  		 			A Pawar 		,  		 			V M Umale 		.  	 	 		\textit{International Conference on Computing Communication Control and Automation (ICCUBEA) Published by IEEE},  				 (Pune, India)  		2018.  	 
\bibitem[Kishore et al. ()]{b11}\label{b11} 	 		‘Internet of Things based Low-Cost Real-Time Home Automation and Smart Security System’.  		 			P T Kishore 		,  		 			K Veeramanikandasamy 		,  		 			S Sabbath 		,  		 			Veerakumar 		.  	 	 		\textit{International Journal of Advanced Research in n Computer and Communication Engineering}  		2017. 6.  	 
\bibitem[A. Akhtar, T. Ahmad, N. Sabahat and S (ed.)]{b3}\label{b3} 	 		\textit{IoT Based Home Automation System Using Thing Speak},  		A. Akhtar, T. Ahmad, N. Sabahat and S (ed.)  		 	 
\bibitem[Al-Ali and Al-Rousan ()]{b8}\label{b8} 	 		‘Java-based home automation system’.  		 			A R Al-Ali 		,  		 			M Al-Rousan 		.  	 	 		\textit{IEEE Trans. Consum. Electron}  		2004. 50  (2)  p. .  	 
\bibitem[Secure Home Entry Using Raspberry Pi with Notification via Telegram N. Hema and J. Yadav ()]{b0}\label{b0} 	 		‘Secure Home Entry Using Raspberry Pi with Notification via Telegram’.  		 \xref{http://dx.doi.org/10.1109/ICSC48311.2020.9182778}{10.1109/ICSC48311.2020.9182778}.  		 \url{https://doi.org/10.1109/ICSC48311.2020.9182778}  	 	 		\textit{N. Hema and J. Yadav}  		2020.  	 	 (References Références Referencias 1) 
\bibitem[Zamora-Izquierdo et al. ()]{b13}\label{b13} 	 		\textit{Smart farming IoT platform based on edge and cloud computing},  		 			M A Zamora-Izquierdo 		,  		 			J Santa 		,  		 			A F Skarmeta 		,  		 			J A Martínez 		,  		 			Vicente Martínez 		.  		2018. ELSEVIER. p. .  	 
\bibitem[Singh and Ansari ()]{b1}\label{b1} 	 		‘Smart Home Automation System Using Internet of Things’.  		 			U Singh 		,  		 			M A Ansari 		.  		 \xref{http://dx.doi.org/10.1109/PEEIC47157.2019.8976842}{10.1109/PEEIC47157.2019.8976842}.  	 	 		\textit{2019 2nd International Conference on Power Energy, Environment and Intelligent Control (PEEIC)},  				2019. p. .  	 
\bibitem[Kundu et al. ()]{b2}\label{b2} 	 		\textit{Smart Home Automation System Using on},  		 			Diponkar \& Kundu 		,  		 			Khallil 		,  		 			\& Md 		,  		 			Das 		,  		 			\& Tushar 		,  		 			Mamun 		,  		 			\& Abdullah 		,  		 			Ahmmad Musha 		.  		 IoT. 10.14299/ ijser.2020.06.03.  		2020.  	 
\bibitem[B. Vaidya, A. Patel, A. Panchal, R. Mehta, K. Mehta and P. Vaghasiya (ed.)]{b5}\label{b5} 	 		\textit{Smart home automation with a unique door monitoring system for old age people using Python, OpenCV, Android and Raspberry pi},  		 \xref{http://dx.doi.org/10.1109/ICCONS.2017.8250582}{10.1109/ICCONS.2017.8250582}.  		B. Vaidya, A. Patel, A. Panchal, R. Mehta, K. Mehta and P. Vaghasiya (ed.)  		 	 
\bibitem[Vaidya et al. ()]{b6}\label{b6} 	 		\textit{Smart Home Automation with a unique door monitoring system for old age people using python, OpenCV, Android and Raspberry pi},  		 			B Vaidya 		,  		 			A Patel 		,  		 			A Panchal 		,  		 			R Mehta 		,  		 			K Mehta 		,  		 			P Vaghasiya 		.  		2017.  	 
\bibitem[Majid Al Kuwari and Ramadan ()]{b10}\label{b10} 	 		‘Smart-Home Automation using IOT-based Sensing and Monitoring Platform’.  		 			Abdulrahman Majid Al Kuwari 		,  		 			Ramadan 		.  	 	 		\textit{IEEE 12th International Conference on Compatibility, Power Electronics and Power Engineering},  				2018.  	 
\bibitem[Kumar ()]{b16}\label{b16} 	 		‘Ubiquitous smart home system using android application’.  		 			S Kumar 		.  	 	 		\textit{International Journal of Computer Networks \& Communications (IJCNC)}  		2014. 6  (1) .  	 
\bibitem[Vinay Chand1 and Veda Chary2 (2013)]{b19}\label{b19} 	 		‘Wireless Home Automation System with Acoustic Controlling’.  		 			R Vinay Chand1 		,  		 			M Veda Chary2 		.  	 	 		\textit{International Journal of Engineering Trends and Technology}  		Sep 2013. 4  (9) .  	 
\end{bibitemlist}
 			 		 	 
\end{document}
